-- phpMyAdmin SQL Dump
-- version 4.7.3
-- https://www.phpmyadmin.net/
--
-- Host: db
-- Generation Time: Aug 22, 2017 at 08:02 PM
-- Server version: 10.2.8-MariaDB-10.2.8+maria~jessie
-- PHP Version: 7.0.21

SET SQL_MODE = "NO_AUTO_VALUE_ON_ZERO";
SET AUTOCOMMIT = 0;
START TRANSACTION;
SET time_zone = "+00:00";


/*!40101 SET @OLD_CHARACTER_SET_CLIENT=@@CHARACTER_SET_CLIENT */;
/*!40101 SET @OLD_CHARACTER_SET_RESULTS=@@CHARACTER_SET_RESULTS */;
/*!40101 SET @OLD_COLLATION_CONNECTION=@@COLLATION_CONNECTION */;
/*!40101 SET NAMES utf8mb4 */;

--
-- Database: `vizon`
--

--
-- Dumping data for table `vizon_drawings`
--

INSERT INTO `vizon_drawings` (`id`, `first`, `second`, `third`, `fourth`, `fifth`, `sixth`, `drawing_date`) VALUES
(1, 2, 4, 9, 11, 13, 24, '2017-08-12 00:00:00'),
(2, 1, 5, 15, 19, 22, 23, '2017-08-15 00:00:00');
COMMIT;

/*!40101 SET CHARACTER_SET_CLIENT=@OLD_CHARACTER_SET_CLIENT */;
/*!40101 SET CHARACTER_SET_RESULTS=@OLD_CHARACTER_SET_RESULTS */;
/*!40101 SET COLLATION_CONNECTION=@OLD_COLLATION_CONNECTION */;
